AutoCAD r11/r12 requires a 80386 computer or higher.  If you are using less,
the program will abort when loaded.

Please refer to the READ.ME file found in your AutoCAD directory for
detailed information on loading, configuring, and using this driver.

AutoCAD r12 owners please see the READ.ME file for additional installation
instructions.


                         Press Any Key to Continue...
