Edit the DISPLAY line in PCADDRV.SYS (found in your root directory) to 
reflect the change in the driver.

                    DSSPVGA.DRV   -  800x600x16
                    DPVGA1K.DRV   - 1024x768x16


     Example:

        system     \pcad\tkcards\sibmpc.drv
        input      \pcad\tkcards\imsser.drv
        display    \pcad\tkcards\dsspvga.drv   <---

        
                         Press a Key to Continue...
