Run the Generic CADD CONFIG program from your CADD directory and select the 
new display driver.  New modes available include:

                         *   640x400x256
                         *   640x480x256
                         *   800x600x 16
                         *   800x600x256
                         *  1024x768x 16
                         *  1024x768x256

                     Press a key to Continue...
