Any existing SHADE.CFG file has been renamed to SHADE.OLD as a backup.                   

                   ╔═════════════════════════════════════════════════╗
                   ║ PLEASE ANSWER THE FOLLOWING QUESTIONS           ║
                   ║ FROM AUTOSHADE AS INSTRUCTED BELOW              ║
       ╓───────────╫═════════════════════════════════════════════════╣
       ║ When asked║ "Select display device"                         ║
       ║ choose:   ║ IBM Video Graphics Array                        ║
       ╟───────────╢═════════════════════════════════════════════════╣
       ║ When asked║ "Select rendering display device"               ║
       ║ choose:   ║ Autodesk Device Interface rendering driver      ║
       ╟───────────╢═════════════════════════════════════════════════╣
       ║ When asked║ "Share a single screen (DEFAULT No)"            ║
       ║ choose:   ║ Yes                                             ║
       ╟───────────╢═════════════════════════════════════════════════╣
       ║ When asked║ "Does FLIPSCREEN require a redraw (DEFAULT No)" ║
       ║ choose:   ║ Yes                                             ║
       ╙───────────╜═════════════════════════════════════════════════╝
                     You MUST enter 'SHADE' at the DOS prompt to start
                     reconfiguration in order for AutoShade to make use
                     of the newly installed driver. You must execute the
                     driver first before typing 'SHADE' to configure.


                           Press Any Key to Continue...

