              ╔════════════════════════════════════════════════╗
              ║   Configuring AutoCAD Release 9 & Release 10   ║
              ╚════════════════════════════════════════════════╝

1.  Run the driver selected (DS800X16.EXE for this example). You will get a 
    message that reads: "AutoCAD Device Interface (ADI) Display Driver"
    which indicates that the AutoCAD driver for the 800 by 600 mode of the
    VGA Card has been loaded into memory.

        Name            Resolution
    ------------       ------------
    DS800X16.EXE       800x600x16  
    DS800FF.EXE        800x600x256 
    DS102416.EXE       1024x768x16
    DS1K256.EXE        1024x768x256

2.  Execute ACAD to start the AutoCAD Release 9/10 program.
3.  From the main menu choose option 5 to configure AutoCAD Release 9/10.
4.  From the configuration menu choose option 3 "Configure video display."
5.  Choose the option for "ADI display v3.1" / "ADI display v4.0" driver from
    the list of available video drivers.  When asked for the hexadecimal 
    interrupt code, choose the default "7A" unless a known conflict exists.
    Type DS800X16 ?, to display an option list.
6.  Exit to the main menu and keep your configuration changes.
7.  AutoCAD is now ready to run by typing DS800X16 (in this example).


                         Press Any Key to Continue...
