You must perform the following steps to use the new driver:

Edit        :   VCAD386.BAT (found in your root directory)
     Change :   the line immediately above VRUN \VCAD386
     To     :   PVGA256P.EXE    for 640x400x256
            :   PVGA256P.EXE    for 640x480x256
            :   PVGA256P.EXE    for 800x600x256
            :   PVGAP.EXE       for 1024x768x16
            :
Execute     :   FIXPVCAD.EXE
Execute     :   UNLOCK.COM

If no errors occur, you can run ENVIRO from your VCAD directory and select
the SpeedStar 24X driver of choice.


                         Press Any Key to Continue...
