You must perform the following steps to use the new driver:

Execute     :   FIXPVCAD.EXE
Execute     :   UNLOCK.COM

If no errors occur, you can run ENVIRO from your VCAD directory and select
the SpeedStar 24X driver of choice.

A VCAD54.BAT file has been provided to help load the new driver.


                         Press Any Key to Continue...
