ENVIRO.CFG has been renamed to ENVIRO.OLD as a backup.  You must perform the
following steps to use the new driver:

Execute     :   FIXPVCAD.EXE
Execute     :   UNLOCK.COM

If no errors occur, you can run ENVIRO from your VCAD directory and select
the SpeedStar 24X driver of choice.

A VCAD53.BAT file has been provided to load the new drivers once installed.


                         Press Any Key to Continue...
