LANUser Screen

Harvard Graphics for Windows has been installed by your network administrator.  LANUser will set up your machine to run Harvard Graphics locally.

Click OK to run LANUser.  Click Cancel to close this window and return to your previous screen without running LANUser.


Add Icon to a Program Group

Use this dialog box to add the displayed icon to a program group in Windows' Program Manager.  You can then click the icon to start the program directly.  Add the icon to one of the Program Groups displayed in the list here.  You can also edit the text that appears beneath the icon by typing directly in the Description box.

To add an icon to a Program Group:

1.	Select the group from the Program Groups list in which you want the icon to appear.

2.	Type the text you want to appear beneath the icon if the default text is not what you want.  You may type up to 25 characters.

Note

You may not want to add the icon if you installed your application previously.  If you don't want to add this icon, click Cancel to go to the next screen.  If no program groups are listed, you may have a damaged program group.  See your Windows manual for instructions on how to fix the program group before continuing installation.


Diskette Error

DOS has detected an error in the diskette you're installing.  Check to make sure the drive door is closed, and install the diskette again.


Final LANUser Screen

Harvard Graphics for Windows has been successfully installed on  your system.  Harvard Graphics stores the file for your personal dictionary in your Windows directory.

Certain directories are shared by Software Publishing products to store commonly used files like fonts and filters.  These directories are created by the Install program on the same drive as your target directory and contain the prefix SPC, for example, C:\SPC\FONT.

You can copy supplemental printer drivers from the Drivers disk.   These drivers are from Microsoft's Supplemental  Drivers Library, and include .DRV and .WPD files.  To install these drivers, you must be in the Windows Program Manager.

Note:

If you're using 5 1/4" disks, the drivers are on two disks.  See Chapter 2 of "Setting Up Harvard Graphics for Windows" for instructions.

To install  a .DRV printer driver:

1.	Open the Main program group in the Program Manager.

2.	Double-click  the Control Panel icon, then double-click the Printers icon.

3.	Click Add Printer.

4.	Scroll to the bottom of the List of Printers list box and double-click Unlisted Printer.

5.	Insert  the Drivers disk into drive A or drive B, and click the appropriate drive letter in the Directories list box.

6.	Double-click on the driver you want to install.  The printer appears in the Installed Printers list  box.

7.	Click OK to close the Printers dialog box.

To install a .WPD printer driver:

1.	Follow the instructions above to install  a .DRV driver.

2.	In the Installed Printers list box, click Postscript  Printer, then click Configure.

3.	In the Printers-Configure dialog box, click Setup.

4.	In the PostScript Printer dialog box, click Add printer.

5.	Type the name of the drive containing the Drivers disk and press Enter.

6.	In the Add Printer list box, click the printer you want to add, then click Add.

7.	Click Done.

Note:

Add Harvard Graphics to the PATH statement of your AUTOEXEC.BAT file so you can run Harvard Graphics from:

 	Any DOS directory.

 	The Run command in the Windows File Manager.

If Harvard Graphics is on a network drive, commands to log in to the network and link to the drive  should follow the PATH statement.  See your network administrator for information about login and link commands.  See your DOS manual for more information about AUTOEXEC.BAT.