Copyright: Made with EasyHelp/Web (www.easyhelp.com)


WorkPace Ordering and Support

Ordering WorkPace

Extending your Trial

Support questions

Terms and Conditions of Sale


Ordering WorkPace

For the current pricing for WorkPace and for information on how to order please contact your local reseller.  Their contact details can be found under the menu Order Info/ Contact Information.

As an alternative current pricing information is available on the WorkPace Website.  If your computer is set up to use the Internet (and you have a web browser installed) simply go to the menu Order Info/Contact Information  and click on the WorkPace URL (www.workpace.com/??).  Your web browser will start automatically (if you have a dial-up connection, make sure your Internet dial-up connection  is running first).  To find pricing information simply go to the Orders and Pricing section of the Website.

You can also order copies of WorkPace online by following the instructions above.


Extending your Trial

If you need more time to trial WorkPace and your current copy has expired you may request a trial extension from your reseller.  Trial extensions are given at the discretion of the reseller.  Normally a trial extension is only given when an order  has been placed, thus allowing you to continue using WorkPace whilst you order is being processed.

To get a trial extension you will need to tell your reseller your Trial Code.

See Menu Order Info/Enter Trial Extension Key to find your Trial Code. This code will be of the form

A86344-3034-008

Once you give your reseller your trial code and your reason for needing a trial extension (if not being accompanied by an order) your reseller will send to you a Trial Extension Code.

Type this code into the Enter Trial Extension Key window and 'Hey Presto' your trial now  works again.


Support Questions

For any support queries please either contact your reseller (see under menu Order Info/ Contact Information),  or go to the Support and Feedback section of the WorkPace Website (for how to get to the WorkPace Website see Ordering WorkPace).


Terms and Conditions of Sale

Limited Warranty

When you submit an order for WorkPace/purchase a copy or copies of WorkPace the order/registration form you submit (by post, fax, email, or Internet) is an agreement between you, the end user, and Niche Software Ltd.  By using the software you agree to be bound by the terms of the agreement.  If you do not agree,  you should promptly return the software and all accompanying items to the place of purchase for a full refund.

Niche Software Ltd has made every effort to ensure that the data contained in the software is accurately represented, that the documentation is complete, and the media is free from defects in materials and workmanship.

The software product is provided 'as is' without warranty of any kind, either express or implied, including, but not limited to, the implied warranties of merchantability and fitness for a particular purpose. As a result, this software, stretches, exercises or documentation are licensed 'as is', and you, the licensee, assume the entire risk as to their result and performance.

IN NO EVENT SHALL NICHE SOFTWARE LTD, ITS AGENTS, NOR ANYONE ELSE WHO HAS BEEN INVOLVED IN THE CREATION, PRODUCTION, OR DELIVERY OF THIS SOFTWARE PRODUCT BE LIABLE WHETHER IN CONTRACT OR TORT (INCLUDING NEGLIGENCE) OR OTHERWISE FOR ANY LOSS OF PROFIT, HEALTH, OR ANY COMMERCIAL DAMAGE, INCLUDING, BUT NOT LIMITED TO, SPECIAL, INCIDENTAL, CONSEQUENTIAL OR OTHER DAMAGES RESULTING FROM THE USE OR INABILITY TO USE THIS SOFTWARE.

If for any reason any party is liable in contract, tort (including negligence) or otherwise that liability shall be limited to replacement of the product and in no instance exceed the purchase price of the product.

User understands and agrees that the limitation of liability stated above represents a wdeliberate allocation of risk.  Without this exculpation of liability, the price charged for WorkPace would necessarily be much greater.

DISCLAIMER

Your risk of injury may be affected by work station design, keyboard design, posture, chair design, time worked without rest breaks, type of work, activities outside the workplace, and individual physiology.  The product WorkPace should in no way be considered a substitute for treatment by a qualified physician.  If you have a pre-existing medical condition, please consult your physician prior to using this product.  If pain develops or continues, discontinue use and consult a qualified physician.

Niche Software Ltd reserves the right to make periodic changes, enhancements, revisions and alterations of any  kind to the software price and / or the On-Line help and Manual without any prior notice to any person, institution, or organisation.