The Next Step in Performance and Functionality

co-Xist for NEXTSTEP opens a window to hundreds of X applications on Sun SPARCstations, IBM RISC System/6000s, HP 9000s, and other platforms. All from within the revolutionary NEXTSTEP environment.

co-Xist is Pencom�s implementation of X11R5, the industry standard X window system that provides a network-transparent and vendor-independent windowing environment. With co-Xist, NEXTSTEP users can display X applications that are running locally or remotely on a network within windows on NEXTSTEP for NeXT, Intel, and Hewlett-Packard systems. Developers can also use co-Xist to port or develop X-based applications for the native processor.

Fully compliant with MIT speci�cations, co-Xist provides NEXTSTEP users with the connectivity critical to function within today�s multi-vendor networked environments. Only co-Xist offers:

¥ A customer-proven, robust and fast X11R5 environment for NeXT computers and NEXTSTEP for Intel and Hewlett-Packard platforms ¥ A Multi-Architecture Binary release ¥ The most complete development and user environment ¥ A range of display options for optimum performance ¥ Fast service and support via e-mail, fax, and toll-free hotline

Features and Bene�ts

Full Compliance with X11R5 Speci�cations Run and develop standard X applications on local or remote platforms with support for localization, a font server, scalable fonts, and PEX.

Multi-Architecture Binary A single binary for NeXT, Intel, and HP systems running NEXTSTEP.

Full Color and Greyscale Support Run X applications in 8-bit pseudo-color, and 16- or 32-bit color. 8-bit greyscale is available on Intel and HP systems. 1-bit monochrome and 2-bit greyscale are available on NeXT systems.

Support for Popular Window Manager Environments Work with your preferred window manager environment including Tab Window Manager, Motif Window Manager, and NEXTSTEP.

Screen Take-Over Mode Option Use for increased display performance and the ability to toggle between NEXT- STEP and X-based applications.

Cut-and-Paste Text Capability Exchange data easily between NEXTSTEP windows and other windowing environments.

co-Xist 3.3 for NEXTSTEP

PRODUCT

Pre-compiled Public Domain Software These include the NCSA�s popular Mosaic, xv, xrn, games, and many more.

GUI-Based Installation For simple and �exible installation and setup.

Application Launch Panel Edit and launch frequently used X applications with a single point and click.

On-line Digital Librarian-Formatted Documentation Rapidly index through X and Motif documentation.

Intel Keyboard Enhancements Additional keycode support for the variety of PC hardware.

co-Xist Package Options 1-800-PENCOM-4

co-Xist Runtime Package

co-Xist Runtime System with Digital Librarian (DL) Documentation, plus Motif 1.2.3 Runtime System and DL Documentation Includes the X server, a number of X clients, fonts, and manual pages allowing the user to display or execute X applications. Additionally, the full set of X11R5 documentation displayed in Digital Librarian (DL) format is included to allow rapid on-line indexing through product reference materials and user information. For the NEXSTEP user who prefers the Motif user interface, this system provides an OSF/Motif 1.2.3 environment including the Motif Window Manager (mwm), User Interface Language (UIL), and manual pages. Additionally, the complete set of on-line Motif 1.2.3 manuals is offered in Digital Librarian format for easy access to Motif documentation.

co-Xist Developer Package

co-Xist Runtime Package plus X11R5 and Motif 1.2.3 Developer Extensions For X and Motif application developers, these extensions contain the libraries and include �les needed to develop, compile, and execute X and Motif applications. Also includes source code for several sample X and Motif applications.

System Requirements co-Xist 3.3 is distributed exclusively on CD-ROM. For Intel and HP platforms, co-Xist requires NEXTSTEP 3.2 or higher. On NeXT platforms, co-Xist runs with NEXTSTEP 3.1 or higher. NEXTSTEP 3.0 is supported with some limitations, contact Pencom for more detail.

Ordering Inf ormation For more information or to place your order, call Pencom at 1-800-PENCOM-4 or contact Pencom via e-mail at co-Xist_info@pencom.com. Please con�rm if you can receive NeXT Mail.

Pencom ¥ 9050 Capital of Texas Highway North ¥ Suite 300 ¥ Austin, Texas 78759 tel: (512) 343-6666 ¥ fax: (512) 343-9650 ¥ e-mail: co-Xist_info@pencom.com

ª 1994 Pencom Systems Incorporated. NEXTSTEP, the NeXT logo, and Digital Librarian are trademarks of NeXT Computer, Inc. OSF/Motif is a trademark of Open Software Foundation, Inc. UNIX is a registered trademark of UNIX Systems Laboratories. X Window System is a trademark of MIT. All other trademarks mentioned are the properties of their respective owners. 3rd Party CD - October 1994. Prices and product speci�cations are subject to change without notice.

Related Services from Pencom:

Systems Integrationn

Software Development

Staf�ng

Training

Support

Testing