Getting More Help

If you are unable to get the help you need from the On-line Help or the user manual, here are some other ways to get answers to your questions:

•	Ask your local Eudora Support Coordinator.

•	Send mail to eudora-support-bus@qualcomm.com. Please include your registration number.

•	Users eligible for telephone support can call 1-800-249-2856 or 1-619-658-1938. Designated technical contacts are eligible for a limited period of telephone support. Please have your registration number ready.