
Enter the type of process:

   D - Daily        The process is executed once a day at the specified time.

   W - Weekly       The process is executed once a week at the specified time
                    and day.

   M - Monthly      The process is executed on the same day each month.

   S - Single       The process is executed a single time, and not repeated.

   Y - Yearly       The process is executed once a year, on the same date.

   O - Other        The time interval between executions of this process is
                    given in minutes.

.pa

These are the functions performed when the following key is pressed:

F1 - Display Help Screen.

F6 - Accept all process changes.

ESC - Cancel all process changes.

TAB, Enter - Go to Date field.
