
Enter the interval in minutes. The interval is the amount of time between
executions of this process. The time interval is measured from the beginning
of one process to the beginning of the next process.

.pa

These are the functions performed when the following key is pressed:

F1 - Display Help Screen.

F6 - Accept all process changes.

ESC - Cancel all process changes.

TAB, Enter - Go to Time field.

Shift-TAB  - Go to Event list field.
