
                            HOW TO CHANGE OPTIONS

       For more information on each option, page down this file...

       1.  Change Profile    Allows the user to change the current
                             default settings for EZMAIL use.
       2.  Maillist Edit     Allows the user to define different
                             mailing lists.
       3.  View DOS Mailbox  Allows the user to view/edit mailbox
                             files residing on the PC.
       4.  Shell to DOS      Allows the user to escape to DOS.  Enter
                             'EXIT' when done to return to the EZMAIL.
       5.  EZ-Update         Automatically update the EZMAIL package
                             to the most current version.


                            <PGDN> for more...

                               CHANGE PROFILE

        If you wish to change your profile information, you may do
        so by selecting the 'OPTIONS' menu and then the 'CHANGE
        PROFILE' option.  Enter the user profile information in the
        profile window, or the <ESC> key to leave the profile with
        no changes.  The first and last names are your own name.
        The userid is your DMINS system login.  The system name is
        your home DMINS system.  The editor will be used by the 'SEND'
        menu, with PED being the default.  The viewer will be the
        program to view all your mail in the 'RECEIVE' menu, with
        Vbrowse being the default.  After all the information is
        entered, your password will be checked against your userid.
        Only a valid password will be allowed to send and receive
        mail.

                            <PGDN> for more...

                              MAILLIST EDIT

        If you wish to edit your mailing list information, you may
        do so by selecting the 'OPTIONS' menu and then the 'MAILING
        LIST' option.  The editor of your choice will be loaded (PED
        is the default) and the mailing list will be entered.  Enter
        each users DMINS alias on a seperate line, and press the <ESC>
        key to save.  A userid may be entered, but the mail will not
        be forwarded to that user's home system by the DMINS system
        doing the mailing.  The default mailing list file is
        'EZMAIL.LST', however you may enter a PC mailing list file of
        your own choice by typing in the file name or a '?' to get a
        directory listing.



                            <PGDN> for more...

                             VIEW DOS MAILBOX

        If you wish to view/edit your PC Mailbox file(s) residing on
        your PC, you may do so by selecting the 'OPTIONS' menu and
        then the 'VIEW DOS MAILBOX' option.  The viewer of your
        choice will load the PC Mailbox file (Vbrowse is the default)
        for viewing or editing.  The default PC Mailbox file is
        'EZMAIL.BOX', however, you may enter another PC Mailbox file
        of your choice by typing in the file name or a '?' to get a
        directory listing.






                            <PGDN> for more...

                              SHELL TO DOS

        If you wish to shell to DOS, you may do so by selecting the
        'OPTIONS' menu and then the 'SHELL TO DOS' option.  EZMAIL
        will temporarily change the DOS shell prompt so that you
        will know to type 'EXIT' in order to return to EZMAIL'.
        Please remember to exit back to the EZMAIL program after
        finishing with DOS.

                                EZ-UPDATE

        If you wish to have the most recent version of the EZMAIL
        package, you may do so by selecting the 'OPTIONS' menu and
        then the 'EZ-UPDATE' option.  EZMAIL will run the EZUPDATE
        program and inform you of any files that have been updated.

                          End of HELP - Press <ESC>


