GLOBAL function Q - Quit

This command allows you to Press
  'S' to end your session and log-off RBBS-PC
  'M' to go to the RBBS-PC MAIN menu
  'F' to go to the RBBS-PC FILE menu
  'U' to go to the RBBS-PC UTIL menu
  'C' to leave the current conference or Sub-board and return to the
      MAIN conference.

