Copyright: Copyriht 1997, Pointix Corporation. All Rights Reserved.


Pointix Hourglass

Pointix Hourglass is a floating utility useful when you need to be reminded about some pending task in short periods of time (e.g., remind you about a call you must do in half an hour).

Click on the various areas of the following figure to display a specific topic.

Menu Options

Silent

Turns off the beep when the timeout is over.

Default:	Reset


Hot Spots


About Pointix Hourglass

Module:	Pointix Hourglass

Version:	1.0

Copyright:	1997, Pointix Corporation.

Contact Pointix

Address

Pointix Corporation

1373 SW 23rd St., Miami

(33154) Florida

USA

URL	  	http://www.pointix.com

Toll Free Number

1-888-pointix

E-mail addresses

_Technical Support	support@pointix.com

_Sales	sales@pointix.com

_General Feedback	feedback@pointix.com

_Press Releases and

  Investing Information	press@pointix.com

_Developers	development@pointix.com

_Trade Shows	events@pointix.com


Timeout Control

Sets the timeout period.


Timeout

Shows the current timeout count i.e.,

the minutes left before the message

shows up.


End Time

Shows the time at which the message

will show up, according to the

set timeout and the current time.


Running Display

Gives you feedback about the

running status of the hourglass.


Control Buttons

Lets you start, stop and load back the

hourglass with the most recently

specified timeout.


Message

Enter the reminder message here.

It will be displayed when you move the cursor

over the hourglass icon, once the timeout is over.