;==========================================================================;
;
;   THIS CODE AND INFORMATION IS PROVIDED "AS IS" WITHOUT WARRANTY OF ANY
;   KIND, EITHER EXPRESSED OR IMPLIED, INCLUDING BUT NOT LIMITED TO THE
;   IMPLIED WARRANTIES OF MERCHANTABILITY AND/OR FITNESS FOR A PARTICULAR
;   PURPOSE.
;
;   Copyright (C) 1992 - 1997 Microsoft Corporation.  All Rights Reserved.
;
;--------------------------------------------------------------------------;
;
;   acmapp16.def
;
;   Description:
;       This is the module definition file...
;
;
;===========================================================================;

NAME	ACMAPP16

DESCRIPTION 'Audio Compression Manager (ACM) Sample Application'

EXETYPE WINDOWS

PROTMODE

STUB	'WINSTUB.EXE'

CODE	MOVEABLE DISCARDABLE	  LOADONCALL
DATA	MOVEABLE MULTIPLE	   PRELOAD

SEGMENTS _TEXT	     MOVEABLE	       PRELOAD
	 INIT_TEXT   MOVEABLE DISCARDABLE    PRELOAD


;- - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - -;
;   NOTE: some of the functions that are called in this application
;   require a LOT of stack space: most notable are the COMMDLG functions
;   (ie GetOpenFileName, etc). a stacksize of ~8k is probably good enough.
;   for the player/recorder i use even more stack--so bump it to 16k.
;- - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - -;

HEAPSIZE    16384
STACKSIZE   16384
