Monitor Refresh Rates
Set up refresh rates for your monitor.


Set Highest
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name
The name of your graphic controller.


Active Display
Select the PC display from this group.


CRT Display
Select CRT display.


Panel Display
Select Flat panel display.


Simultaneous Display
Select CRT & Flat panel simultaneous display.


TV Display
Select TV display.


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free 03
free


free 04
free


free 05
free


free 06
free


free 07
free


free 08
free


free 09
free


free 0a
free


free 0b
free


free 0c
free


free 0d
free


free 0e
free


free 0f
free


free 0g
free


free 0h
free


Monitor Refresh Rates 1
Impostare la frequenza di rinfresco per il monitor.


Set Highest 1
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name 1
Nome e versione BIOS del controllore di grafica.


Active Display 1
Selezionare da questo gruppo il display del PC.


CRT Display 1
Selezionare il display CRT.


Panel Display 1
Selezionare il display piatto.


Simultaneous Display 1
Selezionare simultaneamente i display CRT e piatto.


TV Display 1
Selezionare il display TV.


DDC Auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free 12
free


free 13
free


free 14
free


free 15
free


free 16
free


free 17
free


free 18
free


free 19
free


free 1a
free


free 1b
free


free 1c
free


free 1d
free


free 1e
free


free 1f
free


free 1g
free


Monitor Refresh Rates 2
Réglez les taux de régénération du moniteur.


Set Highest 2
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name 2
Le nom et la version BIOS de votre contrôleur graphique.


Active Display 2
Sélectionnez l'affichage du PC dans ce groupe.


CRT Display 2
Sélectionnez l'affichage de l'écran cathodique.


Panel Display 2
Sélectionnez l'affichage du panneau plat.


Simultaneous Display 2
Sélectionnez l'affichage simultané de l'écran cathodique et du panneau plat.


TV Display 2
Sélectionnez l'affichage de TV.


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free 23
free


free 24
free


free 25
free


free 26
free


free 27
free


free 28
free


free 29
free


free 2a
free


free 2b
free


free 2c
free


free 2d
free


free 2e
free


free 2f
free


free 2g
free


free 2h
free


Monitor Refresh Rates 3
Bildwechselfrequenzen für den Monitor festlegen.


Set Highest 3
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name 3
Name und BIOS-Version der Grafik-Steuereinheit.


Active Display 3
PC-Anzeige aus dieser Gruppe auswählen.


CRT Display 3
Anzeige auf externem Monitor auswählen.


Panel Display 3
Anzeige auf LCD-Display auswählen.


Simultaneous Display 3
Gleichzeitige Anzeige auf externem Monitor und LCD-Display auswählen.


TV Display 3
Anzeige auf externem TV auswählen.


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free 33
free


free 34
free


free 35
free


free 36
free


free 37
free


free 38
free


free 39
free


free 3a
free


free 3b
free


free 3c
free


free 3d
free


free 3e
free


free 3f
free


free 3g
free


free 3h
free


Monitor Refresh Rates 4
Stel de opfrisfrequenties voor de monitor in.


Set Highest 4
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name 4
De naam en de BIOS-versie van uw grafische controller.


Active Display 4
Selecteer de PC-weergave uit deze groep.


CRT Display 4
Selecteer CRT-weergave.


Panel Display 4
Selecteer Plat beeldscherm.


Simultaneous Display 4
Selecteer CRT-weergave en Plat beeldscherm tegelijk.


TV Display 4
Selecteer TV-weergave.


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free 43
free


free 44
free


free 45
free


free 46
free


free 47
free


free 48
free


free 49
free


free 4a
free


free 4b
free


free 4c
free


free 4d
free


free 4e
free


free 4f
free


free 4g
free


free 4h
free


Monitor Refresh Rates 5
Fijar las velocidades de regeneración del monitor


Set Highest 5
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name 5
El nombre y la versión BIOS de la controladora de gráficos


Active Display 5
Seleccionar de este grupo una pantalla de PC


CRT Display 5
Seleccionar la pantalla de CRT


Panel Display 5
Seleccionar la pantalla de panel plana


Simultaneous Display 5
Seleccionar la pantalla simultánea de panel plana y de CRT


TV Display 5
Seleccionar la pantalla de TV


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free 53
free


free 54
free


free 55
free


free 56
free


free 57
free


free 58
free


free 59
free


free 5a
free


free 5b
free


free 5c
free


free 5d
free


free 5e
free


free 5f
free


free 5g
free


free 5h
free


Monitor Refresh Rates 6
Ställ in uppdateringsfrekvensen för din bildskärm.


Set Highest 6
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name 6
Namnet på och BIOS-versionen för din grafiska styrenhet.


Active Display 6
Välj PC-skärm från denna grupp.


CRT Display 6
Välj katodstråleskärm.


Panel Display 6
Välj flat dataskärm.


Simultaneous Display 6
Välj katodstråle- och flat dataskärm simultant.


TV Display 6
Välj TV dataskärm.


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free 63
free


free 64
free


free 65
free


free 66
free


free 67
free


free 68
free


free 69
free


free 6a
free


free 6b
free


free 6c
free


free 6d
free


free 6e
free


free 6f
free


free 6g
free


free 6h
free


Monitor Refresh Rates 7
Indstil refreshhyppigheden for skærmen.


Set Highest 7
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name 7
Navn og BIOS-version for den grafiske styreenhed.


Active Display 7
Vælg PC-display fra denne gruppe.


CRT Display 7
Vælg CRT-display.


Panel Display 7
Vælg panel-display (LCD).


Simultaneous Display 7
Vælg samtidig CRT- og  panel-display.


TV Display 7
Vælg TV-display.


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free 73
free


free 74
free


free 75
free


free 76
free


free 77
free


free 78
free


free 79
free


free 7a
free


free 7b
free


free 7c
free


free 7d
free


free 7e
free


free 7f
free


free 7g
free


free 7h
free


Monitor Refresh Rates 8
Aseta näytön uudistuvuusnopeus.


Set Highest 8
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name 8
Kuvanohjaimen nimi ja BIOS-versio.


Active Display 8
Valitse PC-näyttö tästä ryhmästä.


CRT Display 8
Valitse CRT-näyttö.


Panel Display 8
Valitse Flat panel -näyttö (LCD).


Simultaneous Display 8
Valitse CRT & Flat panel -simultaaninäyttö.


TV Display 8
Valitse TV-näyttö.


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free 83
free


free 84
free


free 85
free


free 86
free


free 87
free


free 88
free


free 88
free


free 89
free


free 8a
free


free 8b
free


free 8c
free


free 8d
free


free 8e
free


free 8f
free


free 8g
free


Monitor Refresh Rates 9
Fijar las velocidades de regeneración del monitor


Set Highest 9
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name 9
El nombre y la versión BIOS de la controladora de gráficos


Active Display 9
Seleccionar de este grupo una pantalla de PC


CRT Display 9
Seleccionar la pantalla de CRT


Panel Display 9
Seleccionar la pantalla de panel plana


Simultaneous Display 9
Seleccionar la pantalla simultánea de panel plana y de CRT


TV Display 9
Seleccionar la pantalla de TV


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free 93
free


free 94
free


free 95
free


free 96
free


free 97
free


free 98
free


free 99
free


free 9a
free


free 9b
free


free 9c
free


free 9d
free


free 9e
free


free 9f
free


free 9g
free


free 9h
free


Monitor Refresh Rates a
Still inn oppfriskningsraten for skjermen.


Set Highest a
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name a
Navnet og BIOS-versjonen for den grafiske styreenheten.


Active Display a
Velg PC som visningsenhet fra denne gruppen.


CRT Display a
Velg CRT-skjerm som visningsenhet.


Panel Display a
Velg flatt panel (LCD-skjerm) som visningsenhet.


Simultaneous Display a
Velg CRT & flatt panel som samtidige visningsenheter.


TV Display a
Velg TV-skjerm som visningsenhet.


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free a3
free


free a4
free


free a5
free


free a6
free


free a7
free


free a8
free


free a9
free


free aa
free


free ab
free


free ac
free


free ad
free


free ae
free


free af
free


free ag
free


free ah
free


Monitor Refresh Rates b
Defina taxas de renovação para o monitor.


Set Highest b
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name b
O nome e a versão BIOS do controlador gráfico.


Active Display b
Escolha o display de PC deste grupo.


CRT Display b
Escolha o display CRT.


Panel Display b
Escolha o display de painel plano.


Simultaneous Display b
Escolha o display simultâneo CRT e painel plano.


TV Display b
Escolha o display TV.


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free b3
free


free b4
free


free b5
free


free b6
free


free b7
free


free b8
free


free b9
free


free ba
free


free bb
free


free bc
free


free bd
free


free be
free


free bf
free


free bg
free


free bh
free


Monitor Refresh Rates c
Regule o índice de renovação para o seu monitor.


Set Highest c
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name c
O nome e versão do sistema BIOS do seu controlador gráfico.


Active Display c
Seleccione o vídeo do seu PC a partir deste grupo.


CRT Display c
Seleccione o vídeo do CRT.


Panel Display c
Seleccione o vídeo de ecrã plano.


Simultaneous Display c
Seleccione o vídeo simultâneo do CRT e do ecrã plano.


TV Display c
Seleccione o vídeo do TV.


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free c3
free


free c4
free


free c5
free


free c6
free


free c7
free


free c8
free


free c9
free


free ca
free


free cb
free


free cc
free


free cd
free


free ce
free


free cf
free


free cg
free


free ch
free


Monitor Refresh Rates d
Set up refresh rates for your monitor.


Set Highest d
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name d
The name of your graphic controller.


Active Display d
Select the PC display from this group.


CRT Display d
Select CRT display.


Panel Display d
Select Flat panel display.


Simultaneous Display d
Select CRT & Flat panel simultaneous display.


TV Display d
Select TV display.


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free d3
free


free d4
free


free d5
free


free d6
free


free d7
free


free d8
free


free d9
free


free da
free


free db
free


free dc
free


free dd
free


free de
free


free df
free


free dg
free


free dh
free


Monitor Refresh Rates e
ƒ‚ƒjƒ^‚ÌƒŠƒtƒŒƒbƒVƒ…‘¬“x‚ð�Ý’è‚µ‚Ä‚­‚¾‚³‚¢�B


Set Highest e
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name e
ƒOƒ‰ƒtƒBƒbƒNƒRƒ“ƒgƒ��[ƒ‰‚Ì–¼‘O‚¨‚æ‚ÑBIOSƒo�[ƒWƒ‡ƒ“�B


Active Display e
‚±‚ÌƒOƒ‹�[ƒv‚©‚çPCƒfƒBƒXƒvƒŒƒC‚ð‘I‚ñ‚Å‚­‚¾‚³‚¢�B


CRT Display e
CRTƒfƒBƒXƒvƒŒƒC‚ð‘I‚ñ‚Å‚­‚¾‚³‚¢�B


Panel Display e
ƒtƒ‰ƒbƒgƒpƒlƒ‹ƒfƒBƒXƒvƒŒƒC‚ð‘I‚ñ‚Å‚­‚¾‚³‚¢�B


Simultaneous Display e
CRT & ƒtƒ‰ƒbƒgƒpƒlƒ‹“¯ŽžƒfƒBƒXƒvƒŒƒC‚ð‘I‚ñ‚Å‚­‚¾‚³‚¢�B


TV Display e
TVƒfƒBƒXƒvƒŒƒC‚ð‘I‚ñ‚Å‚­‚¾‚³‚¢�B


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free e3
free


free e4
free


free e5
free


free e6
free


free e7
free


free e8
free


free e9
free


free ea
free


free eb
free


free ec
free


free ed
free


free ee
free


free ef
free


free eg
free


free eh
free


Monitor Refresh Rates f
½Ð³]©w±zªºÅã¥Ü¾¹­«²M²v¡C


Set Highest f
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name f
±zªº¹Ï¹³±±¨î¾¹¤§¦WºÙ¤Î°ò¥»¿é¤J/¿é¥X¨t²Î(BIOS)ª©¥»¡C


Active Display f
¥Ñ¦¹¸s²Õ¤¤¿ï¾Ü­Ó¤H¹q¸£(PC)Åã¥Ü¡C


CRT Display f
¿ï¾Ü²×ºÝ¾÷(CRT)Åã¥Ü¡C


Panel Display f
¿ï¾Ü¥­­±±±¨îªOÅã¥Ü¡C


Simultaneous Display f
¿ï¾Ü²×ºÝ¾÷¤Î¥­­±±±¨îªO¦P¨BÅã¥Ü¡C


TV Display f
¿ï¾Ü²×ºÝ¾÷(TV)Åã¥Ü¡C


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free f3
free


free f4
free


free f5
free


free f6
free


free f7
free


free f8
free


free f9
free


free fa
free


free fb
free


free fc
free


free fd
free


free fe
free


free ff
free


free fg
free


free fh
free


Monitor Refresh Rates g
ÎªÏÔÊ¾Æ÷ÉèÖÃË¢ÐÂÂÊ¡£


Set Highest g
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name g
ÄãµÄÍ¼ÐÎ¿ØÖÆÆ÷Ãû³Æ¼° BIOS °æ±¾¡£


Active Display g
´Ó±¾×éÖÐÑ¡Ôñ PC ÏÔÊ¾¡£


CRT Display g
Ñ¡Ôñ CRT ÏÔÊ¾¡£


Panel Display g
Ñ¡ÔñÆ½°åÏÔÊ¾¡£


Simultaneous Display f
Ñ¡Ôñ CRT ºÍÆ½°åÍ¬Ê±ÏÔÊ¾¡£


TV Display f
Ñ¡Ôñ TV ÏÔÊ¾¡£


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free g3
free


free g4
free


free g5
free


free g6
free


free g7
free


free g8
free


free g9
free


free ga
free


free gb
free


free gc
free


free gd
free


free ge
free


free gf
free


free gg
free


free gh
free


Monitor Refresh Rates h
¸ð´ÏÅÍ Àç»ý·üÀ» ¼³Á¤ÇÏ½Ê½Ã¿À.


Set Highesth e
Set up refresh rates to the highest values available to both monitor and display adapter.


Chip Name h
±×·¡ÇÈ ÄÁÆ®·Ñ·¯ÀÇ ÀÌ¸§ ¹× ¹ÙÀÌ¿À½º ¹öÀü"


Active Display h
ÀÌ ±×·ì¿¡¼­ PC È­¸éÀ» ¼±ÅÃÇÏ½Ê½Ã¿À.


CRT Display h
CRT È­¸é ¼±ÅÃ


Panel Display h
ÇÃ·§ ÆÐ³Î È­¸é ¼±ÅÃ


Simultaneous Display h
CRT ¹× ÇÃ·§ ÆÐ³Î È­¸é µ¿½Ã ¼±ÅÃ


TV Display h
TV È­¸é ¼±ÅÃ


DDC auto detection
Use DDC (Display Data Channel)  to configure the display.


Adapter Default
Use default system boot up refresh rate.


free h3
free


free h4
free


free h5
free


free h6
free


free h7
free


free h8
free


free h9
free


free ha
free


free hb
free


free hc
free


free hd
free


free he
free


free hf
free


free hg
free


free hh
free