<title>Mokry Systems, s.r.o.</title>
<text>Majdalenky 19 
638 00 Brno 
Èeská Republika

tel :  548 220 003 
fax :  548 220 005</text>

<newline>
<link type="www" url="http://www.mokry.cz/" mark>http://www.mokry.cz/</link>
