Copyright: Hilfe für die Allgemeine Parametersteuerung Deutsch - D91171-21-01 GED


Diese Datei enthält nur kontextabhängige Hilfethemas. Klicken Sie auf ? im Fenster Allgemeine Parametersteuerung, und wählen Sie das Element worüber Sie weitere Informationen wünschen.


Schließt dieses Dialogfeld, ohne die von Ihnen vorgenommenen Änderungen zu speichern.


Zeigt die Standardparametereinstellungen für die Stimme an.


Geben Sie hier Ihren Testsatz bzw. Ihre Testsätze ein.


Wählen Sie den Lesemodus. Wählen Sie Buchstabe für Buchstabe, Wort für Wort, Satz für Satz oder basierend auf Endesignal. Der Eingabetext wird standardmäßig Satz für Satz gelesen.

(Diese Option ist nicht für alle Sprachen verfügbar.)


Wählen Sie die Dauer der Pause zwischen Buchstaben, Wörtern oder Sätzen (abhängig vom Lesemodus). Die Pause kann 0 bis 1.800 Millisekunden lang sein.


Schließt dieses Dialogfeld und speichert sämtliche von Ihnen vorgenommenen Änderungen.


Verwenden Sie den Schieberegler, um die Stimmhöhe einzustellen. Da den Stimmvariationen 1 bis 9 feste Klangwerte zugewiesen sind, kann der Schieberegler nur für benutzerdefinierte Stimmen verwendet werden.


Verwenden Sie den Schieberegler, um die Stimmhöhe einzustellen. Da den Stimmvariationen 1 bis 9 feste Klangwerte zugewiesen sind, kann der Schieberegler nur für benutzerdefinierte Stimmen verwendet werden.


Verwenden Sie den Schieberegler, um die Sprechgeschwindigkeit der Stimme einzustellen. Da den Stimmvariationen 1 bis 9 feste Geschwindigkeitswerte zugewiesen sind, kann der Schieberegler nur für benutzerdefinierte Stimmen verwendet werden.


Verwenden Sie den Schieberegler, um die Sprechgeschwindigkeit der Stimme einzustellen. Da den Stimmvariationen 1 bis 9 feste Geschwindigkeitswerte zugewiesen sind, kann der Schieberegler nur für benutzerdefinierte Stimmen verwendet werden.


Hier können Sie den im Textfeld eingegebenen Text mit den ausgewählten Parameterwerten anhören.


Wählen Sie den Systemkontext: Wählen Sie Text, um Standardtext zu lesen, wählen Sie E-mail, um E-Mail-Nachrichten zu lesen.


Wählen Sie den Systemkontext: Wählen Sie Text, um Standardtext zu lesen, wählen Sie E-mail, um E-Mail-Nachrichten zu lesen.


Geben Sie einen Testsatz im Feld Test ein, und klicken Sie auf die Schaltfläche Sprechen, damit der Satz mit den ausgewählten Parameterwerten gesprochen wird.


Wählen Sie eine Reihe von Stimmeigenschaften aus der Liste aus. Sie haben die Auswahl von Variation 1 (Standardeigenschaften) bis Variation 9. Jeder Variation sind feste Klang- und Geschwindigkeitswerte zugewiesen. Sie können auch eine zusätzliche Stimme erstellen, indem Sie Benutzerdefiniert wählen. Die Klang- und Geschwindigkeitsschieberegler können Sie nur verwenden, wenn die Option Benutzerdefiniert gewählt wurde.


Wählen Sie die gewünschte Stimme (weiblich oder männlich).


Wählen Sie die gewünschte Stimme (weiblich oder männlich).


Verwenden Sie den Schieberegler, um die Lautstärke der ausgewählten Stimme festzulegen.


Verwenden Sie den Schieberegler, um die Lautstärke der ausgewählten Stimme festzulegen.


Wählen Sie die Dauer der Pause zwischen Buchstaben, Wörtern oder Sätzen (abhängig vom Lesemodus). Die Pause kann 0 bis 1.800 Millisekunden lang sein.


Wählen Sie den Lesemodus. Wählen Sie Buchstabe für Buchstabe, Wort für Wort, Satz für Satz oder basierend auf Endesignal. Der Eingabetext wird standardmäßig Satz für Satz gelesen.

(Diese Option ist nicht für alle Sprachen verfügbar.)


Zu diesem Element gibt es kein Hilfethema.


Wählen Sie eine Reihe von Stimmeigenschaften aus der Liste aus. Sie haben die Auswahl von Variation 1 (Standardeigenschaften) bis Variation 9. Jeder Variation sind feste Klang- und Geschwindigkeitswerte zugewiesen. Sie können auch eine zusätzliche Stimme erstellen, indem Sie Benutzerdefiniert wählen. Die Klang- und Geschwindigkeitsschieberegler können Sie nur verwenden, wenn die Option Benutzerdefiniert gewählt wurde.


Zu diesem Element gibt es kein Hilfethema.


Zu diesem Element gibt es kein Hilfethema.


Zu diesem Element gibt es kein Hilfethema.