Klicka på denna knapp för att bekräfta att bildskärmsadaptern fungerar med den nya klockfrekvensen. Om du inte bekräftar den nya inställningen kommer standardinställningarna att återställas när du startar om datorn.


Klicka på denna knapp för att återställa standardinställningarna för grafikklockfrekvens.


Använd detta reglage för att justera grafikklockfrekvensen.


Aktuell grafikklockfrekvens.


Maximal grafikklockfrekvens.


Lägsta grafikklockfrekvens.


Kryssa i denna ruta för att avaktivera stöd för vertikal synkronisering. Detta påverkar videoprestandan.