Click this button to confirm that the display adapter can operate at the new clock speed. If you do not confirm the new setting the default setting will be restored when the computer restarts.


Click this button to reset to the default graphics clock speed.


Use this slider to adjust the graphics clock speed.


Current graphics clock speed.


Maximum graphics clock speed.


Minimum graphics clock speed.


Check this box to disable Vertical Synchronization support. This will affect video performance.