Clique neste botão para salvar as configurações de cor atuais para um esquema novo ou existente.


Clique neste botão para carregar um novo bitmap de teste no monitor pequeno, acima.


Clique neste botão para diminuir o brilho.


Clique neste botão para aumentar o brilho.


Clique neste botão para diminuir o contraste.


Clique neste botão para aumentar o contraste.


Clique neste botão para excluir o esquema de cores seleccionado.


Seleccione um esquema de cores da lista suspensa para alterar as configurações de cor atuais.


Marque esta caixa para permitir que as configurações de sobreposição de vídeo de hardware sejam alteradas.


Clique neste botão para restaurar as últimas configurações salvas.


Clique neste botão para restaurar as configurações padrão especificadas de fábrica.


Use este botão deslizante para ajustar o valor de gama vermelho.


Use este botão deslizante para ajustar o valor de gama verde.


Use este botão deslizante para ajustar o valor de gama  azul.


Marque esta caixa para permitir que as configurações de Glide/OpenGL sejam alteradas.


Marque esta caixa para permitir que as configurações de Direct3D sejam alteradas.


Marque esta caixa para permitir que as configurações de área de trabalho sejam alteradas.


O nível actual de correcção gama vermelha.


O nível actual de correcção gama verde.


O nível actual de correcção gama azul.


Marque esta caixa para movimentar em conjunto os botões deslizantes de gama vermelho, verde e azul.