Klicken Sie hier um die laufende Farbeinstellungen in einer neuen oder existierenden Farbschema zu speichern.


Klicken Sie hier um eine neue Test Bitmap auf das oben liegendes  kleine Bildschirm zu laden.


Klicken Sie hier um die Helligkeit zu senken.


Klicken Sie hier um die Helligkeit zu erhoehern.


Klicken Sie hier um den Kontrast zu  senken.


Klicken Sie hier um den Kontrast zu erhoehern.


Klicken sie hier um die gewaehlte Farbschema zu entfernen.


Waehlen Sie ein Farbschema von der Liste um die Farbeinstellungen  zu aendern.


Markieren Sie diese Leiste um die Hardware Video Overlay zu wechseln.


Klicken Sie hier um die zuletzt gespeicherten Einstellungen zu wiederherstellen.


Klicken Sie hier um die Standardeinstellungen zu wiederherstellen.


Benutzen Sie  den Schieberegler  um die Menge von Rot Gamma zu kontrolieren.


Benutzen Sie  den Schieberegler  um die Menge von Gruen Gamma zu kontrolieren.


Benutzen Sie  den Schieberegler  um die Menge von Blau Gamma zu kontrolieren.


Markieren Sie diese Leiste um Glide/OpenGL Einstellungen zu  aendern.


Markieren Sie diese Leiste um Direct 3D Einstellungen zu aendern.


Markieren sie diese Leiste um Desktop Einstellungen zu aendern.


Rote Gammapegel Korrektion.


Gruene Gammapegel Korrektion.


Blaue Gammapegel  Korrektion.


Markieren sie diese Leiste  um die Rot, Gruen und Blaue Gammapegel zusammen zu fuegen.