M.D_DANLIM
00
5000
Limit pro sr kovou da¤
N
M.D_DANSRA
15
Sr kov  da¤ - %
M.D_DANZAL
20
Z loha na da¤ u DPP a DP
M.D_DANZPP
JS
K¢dy PP pro z lohovou da¤
C
M.D_DEND
10
Den vplaty
1
31
M.D_DNYMES
21.74
Prmrn poet dn¡ v ms¡ci
M.D_DPC
CD
K¢dy PP povaovanch za DP
M.D_DZMES
24
Doba omezen¡ vd.dch.(ms.)
M.D_DZMIN
5320
Maxim ln¡ vdlek pro dchodce
M.D_MAXNEM
270
Max. z klad prmru na nemoc
M.D_NEMMAL
50
Sn¡en  nemocensk  d vka
M.D_NEMMDN
3
Max dn¡ nemoci v n¡zk sazb
M.D_NEMNEJ
NEM
Nejastj¨¡ nemocensk  d vka
M.D_NEMVEL
69
Norm ln¡ nemocensk  d vka
M.D_NOC
3.20
Sazba p©¡platku za noc (K)
M.D_OCRN
9
Dni o¨et©ov n¡
M.D_OCRS
16
Dni o¨et©ov n¡ - samoivitel
M.D_ODPDET
12000
Odpoet na d¡t
13200
14400
M.D_ODPINC
6000
Odpoet na invaliditu  st.
M.D_ODPINP
Odpoet na invaliditu plnou
M.D_ODPINZ
36000
Odpoet na invaliditu ZTP-P
42000
M.D_ODPMIN
24000
Nezdaniteln minimum
26400
28800
M.D_ODPSTU
Odpoet na studenta
9600
M.D_POHOT
Procento za pohotovost
M.D_PREABS
0
Do odprac. doby pro p©esas
2
M.D_PRESC
25
Sazba p©¡platku za p©esas (%)
M.D_PROST
Sazba za ¨kodliv prost©ed¡ K
M.D_SPMIN
400
Hranice £asti na nem. pojist.
M.D_SPZEC
8
Sazba SP - zamstnanec
M.D_SPZTEL
26
Sazba SP - zamstnavatel
M.D_STRANI
18
Sn¡en  cena stravenek
M.D_STRAPL
40
Pln  cena stravenek
M.D_SVAT
Sazba za pr ci ve sv tek (%)
M.D_UVAZEK
42.5
Norm ln¡ £vazek
M.D_ZPSTAT
77
Pl tce ZP st t - % z min.mzdy
80
M.D_ZPZEC
4.5
Sazba ZP - zamstnanec
M.D_ZPZTEL
Sazba ZP - zamstnavatel
5780
M.D_VYLDOB
VCN
Typy vylouench dob pro FPD
6080
2000
18000
Odpoet na dti
32040
3.50
M.D_KORSR
Korekn¡ pol. z kladu % sr ky
6860
2900
Pl tce ZP st t - z klad ZP
34920
21600
6540
13080
45780
10464
4.30
M.D_MINAU
1000
Min. stka za sluebn¡ vozidlo
M.D_RZUMIN
Min. p©eplatku ron¡ho z£t.
360
M.D_MAXNEL
540
Horn¡ limit pro  st.v¨i DVZ
M.D_MAXNEP
60
% pou. sti DVZ nad pln. v¨i
M.D_NDZAKZ
3 1.000
Zpsob zaokrouhlen¡ z kladu ND
1 1.000
M.D_NDDAVZ
5 1.000
Zpsob zaokrouhlen¡ nem.d vky.
M.D_MIMZDA
2200
Minim ln¡ mzda
2500
2650
3250
3600
4000
590
4.80
M.D_PFOSVO
5
Penz.fond - limit pro da¤
01
M.D_PFNAKL
Penz.fond - limit pro FKSP
7540
4500
5.40