{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"KOD","type":"character","width":40},{"name":"OP","type":"number","width":3,"decimals":0},{"name":"TEXT","type":"character","width":60},{"name":"DATUM","type":"date","width":8},{"name":"CAS","type":"character","width":8}],"n_rows":2,"rows_kept":2,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_other","reader":"statdb_count/12"}
["BBBB SSS1",0,"V\u0098robek nem  v\u0098konovou normu !","2000-07-02","20:40:10"]
["BBBB SSS1",0,"V\u0098robek nem  kusovn¡kovou/materi lovou normu !","2000-07-02","20:40:10"]