Klicka på denna knapp för att spara aktuella färginställningar till en ny eller befintlig plan.


Klicka på denna knapp för att ladda en ny testbitmapp i ovanstående lilla monitor.


Klicka på denna knapp för att minska ljusstyrkan.


Klicka på denna knapp för att öka ljusstyrkan.


Klicka på denna knapp för att minska kontrasten.


Klicka på denna knapp för att öka kontrasten.


Klicka på denna knapp för att ta bort markerad färgplan.


Markera en färgplan på rullgardinslistan för att ändra aktuella färginställningar.


Kryssa i denna ruta för att möjliggöra modifiering av inställningar för hårdvarans videoöverlappning.


Klicka på denna knapp för att återställa de senast sparade inställningarna.


Klicka på denna knapp för att återställa de specificerade fabriksinställningarna.


Använd detta reglage för att justera  röd gammamängd.


Använd detta reglage för att justera grön gammamängd.


Använd detta reglage för att justera blå gammamängd.


Kryssa i denna ruta för att möjliggöra ändringar av Glide/OpenGL-inställningar.


Kryssa i denna ruta för att möjliggöra ändringar av Direct3D-inställningar.


Kryssa i denna ruta för att möjliggöra ändringar av Skrivbordsinställningar.


Aktuell nivå för röd gammakorrigering.


Aktuell nivå för grön gammakorrigering.


Aktuell nivå för blå gammakorrigering.


Kryssa i denna ruta för att länka samman reglagen för röd, grön och blå gamma.