Clicca questo pulsante per salvare l’attuale impostazione del colore per un nuovo o gia’ esistente schema.


Clicca questo pulsante per caricare un nuovo test di bitmap dentro il piccolo monitor in alto.


Clicca questo pulsante per diminuire la luminosita’.


Clicca questo pulsante per aumentare la luminosita’.


Clicca questo pulsante per diminuire il contrasto.


Clicca questo pulsante per aumentare il contrasto.


Clicca questo pulsante per cancellare lo schema di colore selezionato.


Seleziona uno schema di colore dalla lista dropdown per cambiare l’impostazione di colore attuale.


Marca questo box per permettere all’ impostazione Hardware Video Overlay di essere modificata.


Clicca questo pulsante per ristabilire l’ultima impostazione salvata.


Clicca questo pulsante per ristabilire la specificata impostazione predeterminata.


Usa questo slider per aggiustare la quantita’ del gamma rosso.


Usa questo slider per aggiustare la quantita’ del gamma verde.


Usa questo slider per aggiustare la quantita’ del gamma blu.


Marca questo box per permetter all’impostazione glide/opengl di essere modificata.


Marca questo box per permetter all’impostazione direct3d di essere modificata.


Marca questo box per permetter all’impostazione Desktop di essere modificata.


Correzione del livello attuale del gamma rosso.


Correzione del livello attuale del gamma verde.


Correzione del livello attuale del gamma blu.


Marca questo box per unire I gamma sliders rosso,verde e blu insieme.