Klik op deze knop om de actuele kleureninstellingen op te slaan in een nieuw of bestaand schema.


Klik op deze knop een nieuw test bitmap in de kleine hierboven staande monitor de laden.


Klik op deze knop om de helderheid te verminderen.


Klik op deze knop om de helderheid te verhogen.


Klik op deze knop om het contrast te verlagen.


Klik op deze knop om het contrast te verhogen.


Klik op deze knop om het geselecteerde kleurenschema te verwijderen.


Selecteer een kleuren schema van de keuzelijst om de actuele kleureninstellingen te veranderen.


Kruis dit vakje aan zodat de Video Overlay-instellingen gewijzigd kunnen worden.


Klik op deze knop om de meest recent opgeslagen instellingen te herstellen.


Klik op deze knop om de opgegeven fabrieksstandaard instellingen te herstellen.


Gebruik deze schuifbalk om de hoeveelheid van Rood gamma aan te passen.


Gebruik deze schuifbalk om de hoeveelheid van Groen gamma aan te passen.


Gebruik deze schuifbalk om de hoeveelheid van Blauw gamma aan te passen.


Kruis dit vakje aan om de Glide/OpenGL-instellingen te wijzigen.


Kruis dit vakje aan om de Direct3D-instellingen te wijzigen.


Kruis dit vakje aan om de Bureaublad instellingen te wijzigen.


Het actuele niveau van Rood gamma correctie.


Het actuele niveau van Groen gamma correctie.


Het actuele niveau van Blauw gamma correctie.


Kruis dit vakje aan om de Rode, Groene en Blauwe gamma-schuifbalken met elkaar te verbinden.