Click this button to confirm that the display adapter can operate at the new clock speed. If you do not confirm the new setting the default setting will be restored when the computer restarts.


Click this button to reset to the default graphics clock speed


Use this to control the graphics clock speed


Graphics Clock Speed


Maximum Clock Speed


Minimum Clock Speed