起動方法

3dfxツールコントロールアプレットには、Windowsコントロールパネルからアクセスすることができます。

1	Windows [スタート]ボタンをクリックし、設定をポイントしてから、コントロールパネルをクリックします。

2	 3dfxツールアイコンをダブルクリックします。


ヘルプの使い方

3dfxツールコントロールページ表示中にF1キーを押すことで、オンラインヘルプにアクセスして利用することができます。これにより、3dfxツールの制御に関する一般ヘルプ情報が表示されます。

 すべてのヘルプの内容には、 オンラインヘルプ内から、または、3dfxツールコントロールアプレットのヘルプボタンをクリックすることによってアクセスすることができます。これにより、3dfxツールクエリに対する情報を提供します。


特定のツールのヘルプの使い方

オンラインヘルプは、個別のツールごとに利用するこどができ、いずれかのツールコントロールページが表示中に、F1キーを押すことによってアクセスすることができます。これにより、現在のページに関するヘルプ情報が表示されます。


3dfxツールを削除する

以下の手順で、3dfxツールをご使用のシステムから削除します:

1	すべてのプログラムを閉じます。

2	Windows [スタート]ボタンをクリックし、設定をポイントしてから、コントロールパネルをクリックします。

3	 アプリケーションの追加と削除アイコンをダブルクリックします。

4	画面上の指示に従います。

5	3dfxツールの削除を完了するには、システムを再起動しなければなりません。


3dfxツールコントロールページ

これは、3dfxツール用の総合的なコントロールページです。

このコントロールページは、現在インストールされているツールすべてのリストを含み、ユーザは必要に応じてこれらのツールを使用可能または使用不可にすることができます。

2つ以上のグラフィックアクセラレータをインストールしている場合、特定カードごとに使用可能または使用不可にすることができます。


ツールを使用可能または使用不可にする方法

次の手順でツールを使用可能または使用不可にします :

1	ツールを使用可能または使用不可能にしたいグラフィックスアクセラレータを選択します。

2	必要に応じて、ツールのチェックボックスにチェックをつけたり消したりします。

3	変更を適用したい場合には、更新ボタンまたはOKボタンをクリックします。

変更を元に戻したい場合には、キャンセルをクリックします。

使用不可能なツールのコントロールページは、3dfxツールアプレットまたは高度な設定ページには表示されません。


3dfx Toolsのバージョン情報

3dfxツールバージョン情報ボックスには、3dfxツールコントロールアプレットのタイトルバーを左クリックして、バージョン情報3dfxツールを選択することによってアクセスすることができます。

このバージョン情報ボックスには、バージョン情報を含みます。