Procedimenti preliminari

È possibile accedere alla parte gestionale dell'applicativo 3dfx Tools tramite il pannello di controllo di Windows.

1	Cliccare sul pulsante Start di Windows, selezionare Impostazioni e cliccare su Pannello di controllo subito dopo.

2	Cliccare due volte sull'icona 3dfx Tools.


Consultazione Guida

È possibile consultare la Guida in linea premendo semplicemente il tasto F1 all'interno della pagina di controllo di 3dfx Tools. Verranno così visualizzate delle informazioni guida generali su come controllare questo applicativo.

È possibile accedere all'indice completo della guida dall'interno delle pagine in linea  oppure cliccando sul pulsante Guida sulla barra di controllo di 3dfx Tools. Con questa procedura sarà possibile ottenere chiarimenti su qualsiasi perplessità legata all'uso dell'applicativo.


Per uno strumento particolare

La guida in linea è disponibile per qualsiasi strumento individuale premendo semplicemente il tasto F1 all'interno di una pagina di controllo qualsiasi.  Verranno così visualizzate le informazioni guida sulla pagina corrente.


Rimozione di 3dfx Tools

Per rimuovere 3dfx Tools dal proprio sistema:

1	Chiudere tutti i programmi.

2	Cliccare sul pulsante Start di Windows, selezionare Impostazioni e cliccare su Pannello di controllo subito dopo.

3	Cliccare due volte sull'icona Installazione applicazioni.

4	Seguire le istruzioni visualizzate sullo schermo.

5	Tenere presente che bisogna riavviare il sistema per completare la rimozione totale di 3dfx Tools.


Pagina di controllo di 3dfx Tools

Questa è la pagina di controllo generale di 3dfx Tools.

Essa contiene un elenco di tutti gli strumenti al momento installati, consentendo all'utente di attivarli o disattivarli a proprio piacimento.

Qualora siano installati più acceleratori grafici, l'utilità può essere attivata o disattivata per ogni scheda specifica.


Come attivare o disattivare uno strumento

Per attivare o disattivare uno strumento:

1	Seleziona l'acceleratore grafico da attivare o disattivare l'utilità.

2	Selezionare o deselezionare la casella di opzione come richiesto dal caso.

3	Cliccare sul pulsante Applica oppure su quello Ok per confermare le modifiche.

Per annullare le modifiche, cliccare su Annulla.

Notare che le pagine di controllo relative agli strumenti disattivati non verranno visualizzate nella parte relativa ad 3dfx Tools oppure in quella relativa alle Impostazioni avanzate.


Informazioni su 3dfx Tools

È possibile accedere alla finestra Informazioni di Edge Tools cliccando con il pulsante sinistro del mouse sulla relativa barra titoli e selezionando Informazioni su 3dfx Tools.

La finestra Informazioni indica anche la versione dell'applicativo stesso.