 انقر فوق هذا الزر لإعادة الإعدادات إلى آخر قيم حُفظت.


 انقر فوق هذا الزر لإعادة  كل الإعدادات إلى قيم المصنع الافتراضية.


 انقر فوق سهم اللائحة المنسدلة لسرد الخيارات التالية لجودة عرض الفيديو:

- اختيار "عادي" سيحدد مستوى جودة الفيديو لإعطاء أفضل أداء للإكساء.

-  اختيار "عالي" سيحدد مستوى جودة الفيديو لإعطاء أفضل جودة مرئية، لكنه من الممكن أن يخفض من أداء الإكساء.

-  اختيار "تلقائي" سيحدد مستوى جودة الفيديو تلقائيا لإعطاء أفضل أداء وجودة مرئية ممكنة في نفس الوقت.


 استخدم أداة التحكم هذه لتعديل كمية الغاما (gamma) الحمراء.


استخدم أداة التحكم هذه لتعديل كمية الغاما الخضراء.


 استخدم أداة التحكم هذه لتعديل كمية الغاما الزرقاء.


اختر هذا المربع لحفظ 2 ميغابيت من ذاكرة النسيج (texturing) من أجل أداة تخطيط النسيج في برمجية Glide. لن تعمل بعض ألعاب Glide بشكل صحيح إذا لم يكن هذا الخيار مختاراً.


اختر هذا المربع لتمكين التخزين الانتقالي (buffering) الثلاثي حيثما يكون هناك لدى برمجية Glide ذاكرة وافية للتخزين الانتقالي للإطار لدعم هذه الميزة. من الممكن أن يؤدي هذا إلى تحسن في أداء الإكساء، لكن ليست كل البرمجيات متطابقة مع التخزين الانتقالي الثلاثي ومن الممكن أن يظهر في بعضها خطوط اصطناعية.


 اختر هذا المربع لتعطيل شاشة Glide الافتتاحية.


اختر هذا المربع لتمكين تنقيط (dithering) النسيج. من الممكن أن يؤدي هذا إلى تحسن في الجودة المرئية، لكنه من الممكن أيضا أن يحصل تخفيض في أداء الإكساء.


اختر هذا المربع لفرض التمليس (anti-aliasing) من نوع Direct3D. من الممكن أن يؤدي هذا إلى تحسن في الجودة المرئية بدون أي تخفيض في الأداء.


 اختر هذا المربع لتمكين صيغة التغطية.


 اختر هذا المربع للسماح بتعديل إعدادات Glide/OpenGL.


 اختر هذا المربع للسماح بتعديل إعدادات Direct3D.


 اختر هذا المربع للسماح بتعديل إعدادات سطح المكتب.


 قيمة الغاما الحمراء.


قيمة الغاما الخضراء.


قيمة الغاما الزرقاء.


 انقر فوق سهم اللائحة المنسدلة لسرد الخيارات التالية لجودة مزج ألفا (alpha blending):

- اختيار "أملس" سيؤدي إلى صورة ذات جودة أنعم للإكساء من نوع مزج ألفا.

-  اختيار "أوضح" سيؤدي إلى صورة ذات تفاصيل عالية للإكساء من نوع مزج ألفا.

-  اختيار "تلقائي" سيعدل جودة الإكساء من نوع مزج ألفا تلقائيا لإعطاء أفضل صورة ممكنة.


 اختر هذا المربع لوصل الشرائط الزالقة للغاما الحمراء والخضراء والزرقاء مع بعضها.