كيفية الشروع في العمل

يمكنك التوصل إلى برمجية 3dfx للتحكم بالأدوات من خلال لوحة التحكم في Windows.

1	انقر فوق زر ابدأ، ثم أشر إلى إعدادات وانقر فوق لوحة التحكم.

2	انقر نقرا مزدوجا فوق رمز أدوات 3dfx.


الحصول على تعليمات

التعليمات الفورية متيسرة ويمكن التوصل إليها بالضغط على مفتاح F1 بينما تكون في صفحة التحكم لأدوات 3dfx. تظهر هذه العملية تعليمات عامة عن التحكم بأدوات 3dfx.

 ويمكن التوصل إلى كافة مواضيع التعليمات من خلال التعليمات الفورية أو بالنقر فوق زر تعليمات في برمجية 3dfx للتحكم بالأدوات. تعطي هذه العملية معلومات عن أي استفهام حول أدوات 3dfx.


لأداة معينة

التعليمات الفورية متيسرة لكل أداة فردية ويمكن التوصل إليها بالضغط على مفتاح F1 بينما تكون في أي من صفحات التحكم بالأدوات. تظهر هذه العملية تعليمات عن الصفحة الحالية.


إزالة أدوات 3dfx

لإزالة أدوات 3dfx من جهازك:

1	اغلق كل البرامج.

2	انقر فوق زر ابدأ، ثم أشر إلى إعدادات وانقر فوق لوحة التحكم.

3	انقر نقرا مزدوجا فوق رمز إضافة / إزالة البرامج.

4	اتبع التوجيهات التي تظهر على الشاشة.

5	يجب أن تعيد تشغيل جهازك لإكمال عملية إزالة أدوات 3dfx.


صفحة التحكم بأدوات 3dfx

هذه هي صفحة التحكم العام لأدوات 3dfx.

تحتوي هذه الصفحة على لائحة بكافة الأدوات المثبتة حاليا وتسمح للمستخدم بتمكين أو بتعطيل هذه الأدوات حسب الطلب.

إذا كان هناك أكثر من مسرع رسوميات واحد مركب في الجهاز فيمكن تمكين أو تعطيل الأدوات لكل بطاقة معينة.


كيفية تمكين أو تعطيل أداة

لتمكين أو تعطيل أداة:

1	اختر مسرع الرسوميات الذي تريد تمكين أو تعطيل أدواته.

2	اختر أو أزل اختيار مربع الاختيار حسب الطلب.

3	انقر فوق زر تطبيق أو موافق إذا شئت أن تطبق التغييرات.  إذا أردت أن تلغي التغييرات انقر فوق إلغاء الأمر.

لن تظهر صفحات التحكم للأدوات المعطلة في برمجية 3dfx للتحكم بالأدوات أو في صفحة الإعدادات المتقدمة


عن أدوات 3dfx

يمكن التوصل إلى مربع عن في أدوات 3dfx بنقر زر الماوس الأيسر فوق شريط العنوان لبرمجية 3dfx للتحكم بالأدوات واختيار عن أدوات 3dfx.

يحتوي مربع عن على معلومات عن الإصدار.