Tällä painikkeella voit palauttaa viimeksi tallennetut arvot.


Tällä painikkeella voit palauttaa tehtaan oletusasetukset.


Nuolta napsauttamalla saat esiin seuraavat videokuvan laatuun vaikuttavat asetukset:

- “Normaali"-asetus asettaa videokuvan laadun sellaiseksi, että kuvat muodostuvat mahdollisimman nopeasti.

- “Suuri“-asetus asettaa videokuvan laadun parhaaksi mahdolliseksi. Tällöin nopeus kärsii.

- “Automaattinen“-asetus optimoi nopeuden ja videokuvan laadun.


Säädä punaista gamma-arvoa tällä säätimellä.


Säädä vihreää gamma-arvoa tällä säätimellä.


Säädä sinistä gamma-arvoa tällä säätimellä.


Kun valitset tämän valintaruudun, Glide-sovellus varaa 2 megatavua muistia pinnoitukseen. Jotkin Glide-pelit eivät ehkä toimi oikein, ellei tätä asetusta valita.


Tällä valintaruudulla voi ottaa käyttöön kolmoispuskuroinnin, jos Glide-sovelluksella on riittävästi kehysmuistia kolmoispuskuroinnin tukemiseksi. Tämä voi nopeuttaa kuvanmuodostusta. Kaikki sovellukset eivät kuitenkaan tue kolmoispuskurointia. Joidenkin sovellusten kohdalla kuvaan voi tulla vääristymiä.


Kun valitset tämän valintaruudun, Glide-aloitusnäyttöä ei näytetä.


Kun valitset tämän  valintaruudun, pinnoituksen mipmap-pehmennys otetaan käyttöön. Tämä voi parantaa kuvanlaatua, mutta kuvanmuodostus voi hidastua.


Tällä valintaruudulla otetaan käyttöön Direct3D:n anti-alias-toiminto. Tämä voi parantaa kuvanlaatua, mutta kuvanmuodostus voi hidastua hieman tai ei lainkaan.


Ota limitystila käyttöön tällä valintaruudulla.


Voit mahdollistaa Glide/OpenGL-asetusten muuttamisen valitsemalla tämän valintaruudun.


Voit mahdollistaa Direct3D-asetusten muuttamisen valitsemalla tämän valintaruudun.


Voit mahdollistaa työpöydän asetusten muuttamisen valitsemalla tämän valintaruudun.


Punainen gamma-arvo.


Vihreä gamma-arvo.


Sininen gamma-arvo.


Seuraavat alfapehmennyksen asetukset tulevat näyttöön valikkonuolta napsauttamalla:

- “Pehmeämpi“-asetus tuottaa pehmeämmän kuvan alfasekoitetussa kuvanmuodostuksessa.

- “Terävämpi“-asetus tuottaa terävämmän kuvan alfasekoitetussa kuvanmuodostuksessa.

- “Automaattinen“-asetus hakee automaattisesti optimaaliset asetukset alfasekoitetulle kuvanmuodostukselle.


Tällä valintaruudulla voit yhdistää punaisen, vihreän ja sinisen gamma-arvon liukusäätimet yhteen.