시작하는 방법

3dfx Tools 제어 애플릿은 Windows 제어판을 통해 볼 수 있습니다.

1	Windows 시작 단추를 클릭하고 설정에 포인터를 가져다 댄 후 제어판을 클릭합니다.

2	3dfx Tools 아이콘을 두 번 클릭합니다.


도움말 얻기

온라인 도움말은 3dfx Tools 제어 페이지에서 F1 키를 눌러서 볼 수 있습니다.  이 키는 3dfx Tools 제어에 관한 일반적인 도움말 정보를 보여 줍니다.

전체 도움말 내용은 온라인 도움말 내에서 보거나 3dfx Tools 제어 애플릿의 도움말 단추를 클릭하여 볼 수 있습니다.  3dfx Tools 문의에 대한 정보를 제공합니다.


특수 도구에 관해

각 개별 도구마다 온라인 도움말을 가지고 있으며 도구 제어 페이지 아무 곳에서라도 F1 키를 눌러서 볼 수 있습니다.  이 키는 현재 페이지에 대한 도움말 정보를 보여 줍니다.


3dfx Tools 제거

3dfx Tools를 시스템에서 제거하려면:

1	프로그램을 모두 닫습니다.

2	Windows에서 시작 단추를 클릭하여 설정에 포인터를 가져다 댄 다음, 제어판을 클릭합니다.

3	프로그램 추가/제거 아이콘을 두 번 클릭합니다.

4	화면상의 지시에 따릅니다.

5	3dfx Tools 제거를 완료하려면 시스템을 다시 시작해야 합니다.


3dfx Tools 제어 페이지

이것은 3dfx Tools에 대한 전반적인 제어 페이지입니다.

이 제어 페이지에는 현재 설치된 모든 도구 목록이 들어 있어서 사용자가 이 도구를 필요에 따라 사용하거나 사용하지 않도록 할 수 있습니다.


도구를 사용하거나 사용하지 않는 방법

도구를 사용하거나 사용하지 않으려면:

1	필요에 따라 도구의 확인란을 선택, 또는 선택 취소합니다.

2	변경을 적용하려면 적용 또는 확인 단추를 클릭합니다.

변경을 취소하려면 취소를 클릭합니다.

사용하지 않는 도구에 대한 제어 페이지는 3dfx Tools 제어 애플릿이나 고급 설정 페이지에 표시되지 않습니다.


3dfx Tools 정보

3dfx Tools 상자 정보는 3dfx Tools 제어 애플릿의 제목 막대를 왼쪽 클릭하여 3dfx Tools를 선택하면 볼 수 있습니다

상자 정보에는 버전 정보가 들어 있습니다.