Erste Schritte

Das 3dfx Tools-Steuerungsprogramm kann über die Windows-Systemsteuerung aufgerufen werden.

1	Klicken Sie auf die Windows-Start-Schaltfläche, zeigen Sie auf Einstellungen, und klicken Sie dann auf Systemsteuerung.

2	Doppelklicken Sie das 3dfx Tools-Symbol.


Hilfe Aufrufen

Online-Hilfstexte sind verfügbar und können mit der Taste F1 aufgerufen werden, wenn Sie sich auf der 3dfx Tools-Steuerungsseite befinden. Hiermit werden allgemeine Hilfstexte zur Steuerung der 3dfx Tools-Dienstprogramme aufgerufen.

 Der gesamte Inhalt der Benutzerhilfe kann von innerhalb der Online-Hilfe aufgerufen werden, oder indem Sie die Schaltfläche Hilfe im 3dfx Tools-Steuerungsprogramm anklicken. Hiermit werden Informationen zu allen 3dfx Tools-Anfragen angezeigt.


Für ein Spezifisches Dienstprogramm

Online-Hilfstexte sind auch für die einzelnen Dienstprogramme verfügbar, und können mit der Taste F1 aufgerufen werden, wenn Sie sich in einer beliebigen Dienstprogramm-Steuerungsseite befinden.  Hiermit werden Hilfstexte zur aktuellen Registerseite aufgerufen.


3dfx Tools Deinstallieren

Gehen Sie wie folgt vor, um 3dfx Tools aus Ihrem System zu entfernen:

1	Schließen Sie alle Programme.

2	Klicken Sie auf die Windows-Start-Schaltfläche, zeigen Sie auf Einstellungen, und klicken Sie dann auf Systemsteuerung.

3	Doppelklicken Sie auf das Symbol Software.

4	Befolgen Sie die auf dem Bildschirm eingeblendeten Anweisungen.

5	Das System muß neu gestartet werden, um die Entfernung von 3dfx Tools zu beenden.


3dfx Tools-Steuerungsseite

Dies ist die allgemeine Steuerungsseite für 3dfx Tools.

Die Steuerungsseite enthält eine Liste aller aktuell installierten Dienstprogramme, und bietet dem Benutzer die Möglichkeit, diese Dienstprogramme nach Bedarf zu aktivieren bzw. deaktivieren.


Um ein Dienstprogramm zu Aktivieren bzw. Deaktivieren

Gehen Sie wie folgt vor, um ein Dienstprogramm zu aktivieren bzw. deaktivieren:

1	Das Kontrollkästchen des Dienstprogramms nach Bedarf markieren bzw. dessen Markierung aufheben.

2	Die Schaltfläche Übernehmen oder OK anklicken, um diese Änderungen zu übernehmen.

Klicken Sie auf Abbrechen, falls Sie die Änderungen rückgängig machen wollen.

Die Steuerseiten für deaktivierte Dienstprogramme werden nicht im Edge Tools-Steuerungsprogramm oder in der Registerseite „Erweiterte Einstellungen“ angezeigt.


Info über 3dfx Tools

Das Dialogfeld Info über für 3dfx Tools kann mit einem Klick mit der linken Maustaste auf die Titelleiste des 3dfx Tools-Steuerungsprogramms und Auswahl von Info über 3dfx Tools aufgerufen werden.

Das Dialogfeld Info über enthält Angaben zur Version.