按此按钮将所有设置重设为最新保存值。


按此按钮将所有设置重设为原厂家默认值。


在此方框打勾将红、绿、蓝珈马游标连接起来。


用此控制游标调整红珈马量。


用此控制游标调整绿珈马量。


用此控制游标调整蓝珈马量。


在此方框打勾为Glide应用程序的纹理测绘单元保留2兆字节纹理存储器。 如不选择本方框，有些Glide游戏可能不能正确运行。


在此方框打勾在Glide应用程序有足够帧缓冲存储器之处起动三重缓冲进行支持。这样可能改善再现性能，但是并非所有应用程序都与三重缓冲相兼容，有些可能会视觉假象。


在此方框打勾截止Glide防溅射屏幕。


在此方框打勾起动纹理mipmap高频振动。这样可以改善视觉质量，但是可能降低运行性能。


在此方框打勾强迫`直接3D`减少边缘反差。这样可以改善视觉质量，又不降低运行性能。


在此方框打勾起动重叠状态。


在此方框打勾，以修改Glide/OpenGL设置。


在此方框打勾，以修改`直接3D`设置。


在此方框打勾，以修改桌面设置。


红珈马值。


绿珈马值。


蓝珈马值。