如何开始

3dfx Tools软件控制程序可通过视窗控制面板进入。

1	单击视窗开始按钮, 指向设置, 然后单击控制面板.

2	双击3dfx Tools软件图标.


获得帮助

有直接在线帮助，可在3dfx Tools控制页面时按F1键获取。此时将显示控制3dfx Tools软件的一般帮助信息。

所有帮助信息内容可在在线帮助内容内获得，也可在3dfx Tools软件控制程序内单击帮助按钮。这时提供有关3dfx Tools软件的所有信息.


某一工具的帮助信息

每一工具均有在线帮助，可在该工具控制页面内按F1键获取。这将显示现行页面的帮助信息。


删除3dfx Tools软件

从您系统:中删除3dfx Tools软件：

1	关闭所有程序。

2	单击视窗开始按钮, 指向设置, 然后单击控制面板。

3	双击添加/删除程序图标。

4	按照荧屏上的指令操作。

5	您必须重新启动系统，才能完全删除3dfx Tools软件。


3dfx Tools软件控制页面

本页为3dfx Tools软件总控制页面。

控制页面有一目前已安装的工具清单，用户可自行启动或截止这些工具。


如何启动或截止工具

启动或截止某一工具:

1	根据需要选择或取消该工具选择方框。

2	如果您想实施此变化，单击应用或确定按钮。

如果您要取消此变化，单击取消按钮。

删除工具的控制页面不会显示在利器软件控制程序中，也不会显示在高级设置页面上。


3dfx Tools软件简介

左击3dfx Tools软件控制程序的标题栏，选择3dfx Tools软件简介，便可进入3dfx Tools软件简介方框。

简介方框包含有版本信息。