; CurveLdr.def : Declares the module parameters for the DLL.

LIBRARY      "CURVELDR"
DESCRIPTION  'CURVELDR Windows Dynamic Link Library'

EXPORTS
    ; Explicit exports can go here
	vfLoad		@2
	vfCommand	@3
	vfDrawEvent	@4