Copyright: (c) Hewlett-Packard


Area Fill
Area Fill.

This part of the Print Quality plot tries to:

- Check the print quality when printig area fills (CAD 3D and LFP).

- Show the ink media interactions.

- Validate the media and print quality settings.

- Set the optimal Lightness.