Copyright: (c) Hewlett-Packard


Remove Service Station
Removing the Service Station

1-Disconnect the four SHORT tubes from the primer ink separator.

2- Remove the screw that attaches the service station to the left side plate.

3- Slide the service station to the left, and remove it from the plotter.

Note:

The service station is one orderable assembly. Do not open it.