Copyright: (c) Hewlett-Packard


Removing Primer
Removing the Primer.

1-Disconnect the four SHORT tubes from the ink separator.

2- Remove the screw that attaches the primer to the left side-plate.

3- Slide the primer to the left, and remove it from the plotter.