Copyright: (c) Hewlett-Packard


Remove Bail Lift Mechanism
Removing the Bail-Lift Mechanism.

1-While pushing the top of the bail-gear assembly towards the front of the plotter,

do the following:

On the engaging lever, move the cable ball slightly towards the back of the plotter.

 Allow the engaging lever to move towards the left of the plotter, so that the cable comes free of the lever.

2- Release the cable from the engaging-lever support.

3- Release the cable from the bail-gear assembly.

4-Remove the engarging lever

5- Remove the spring from the bail-gear assembly.

6- Loosen the screw from the top of the bail-gear assembly.

7- Remove the screw from the plastic bail gear.

Note:

You may need to hold the bail cam steady inside the side-plate at the same time. You can access the cam though the hole underneath the side-plate.

8- Pull the bail gear assembly out from the plotter.

Note:

The cam falls to the floor of the plotter.