Copyright: (c) Hewlett-Packard


Remove Reassemble Cartridge Carriage
Removing and Reassembling the Cartridge Carriage.

____________________________________________________________________________

CAUTION

In the following step, take care not to break the black plastic tab on top of the motor.

____________________________________________________________________________

1- Press the carriage motor towards the left, and remove the belt from the motor shaft.

Note:

If you need greater maneuverability of the motor, press the black tab on top VERY SLIGHTLY downwards.

Reassembling:

Make sure the belt is correctly positioned on the grooves of the shaft.

2-Rotate the motor on its hinge out towards the back of the plotter.

3- Release the belt from the pulley on the left of the plotter.

Reassembling:

Make sure the belt is correctly positioned on the grooves of the pulley.

________________________________________________________________________________________

WARNING

In the following steps, take care neither to cut yourself on the encoder strip, nor to damage the strip.

________________________________________________________________________________________

4- Release the two indicated clips on the top of the cartridge carriage by pulling them slightly outwards.

5-Pull the top of the carriage up.

6- Disconnect the trailing cable from the connector on the carriage.

7-Rest the top of the carriage on the trailing-cable guide.

________________________________________________________

WARNING

In the following step, take care not to spill ink from the carriage.

________________________________________________________

8- Slide the carriage to the right, and remove it with the belt from the plotter.

Reassembling:

Position the belt UNDER the black extrusion of the carriage.

8- Refasten the media-sensor cable in its clip. making sure that it does not obstruct motion of the media-sensor flags.