Copyright: (c) Hewlett-Packard


Remove Media Sensor Assembly
Removing the Media-Sensor Assembly.

1- Pull the media-sensor assembly down from the underside of the entry platen,

2- Release the media-sensor cable from the indicated clip.

3- Remove the media-sensor assembly from the plotter.