Copyright: (c) Hewlett-Packard


Remove Carriage Motor
Removing Carriage Motor.

1- Disconnect the carriage-motor cable from the main PCA (connector MOT Y), and from the clip at the back of the plotter.

______________________________________________________________________

CAUTION

In the following step, take care not to break the black plastic tab on top of the motor.

______________________________________________________________________

2- Press the carriage motor towards the left, and remove the belt from the motor shaft.

Note:

If you need greater maneuverability of the motor, press the black plastic tab on top VERY SLIGHTLY downwards.

3- Slightly rotate the motor on its hinge until the indicated part of the black plastic is parallel with the side of the chassis beam.

4- Pull the motor out to the right of the plotter.

Note:

The motor may be stiff.