Copyright: (c) Hewlett-Packard


Remove Left End-Cover
Removing the left end-cover.

1- Release the three clips at the bottom of the end-cover: first the side clip, then the front and back clips.

    These may be stiff.

2- Pull the end-cover up, and remove it from the plotter.

Reassembling:

It's not easy to reinstall the end-covers on the plotter. With some practice, you should learn the knack. As a guide, before you replace an end-cover, take a look at the various clips on its inside, and identify where they fit on the plotter.