Copyright: (c) Hewlett-Packard


Remove and Reassemble electronics module
Removing and Reassembling the Electronics Module.

1- Remove the indicated two screws from the back cover.

2-  Remove the indicated screws from the floor of the electronics module.

3- At the back of the plotter, ensure that the two small wire clamps of the parallel port are positioned flush against the electronics module.

4- Push the electronics module towards the front of the plotter.

5-  Pull the electronics module to the right, in order to easily access the connectors

6- Disconnect all cables from the visible part of the main PCA.

Reassembling:

The connectors and cables correspond as follows:

Prevent tugging on the cables at the point of connection by leaving slack between the connectors and the clips.

7- Pull the electronics module further to the right and out of the plotter.

Reassembling:

Slide the module into the plotter until it is stopped by its location hook on the floor of the plotter. Be careful not to damage the parallel-port clamps.